tv: 386 540

DRACO_1--test plot DRACO1

RA= 14:15:08.26 Dec= 052:06:33.2 PA(2000.000)= -47.000; PA(2002.691)= -47.014

(jj.mng Sat 00:22:50 10-Aug-2002)